5mm BLEED (this will be trimmed off)

T R I M L I N E

10mm DANGER ZONE (anything in this area could be trimmed off)

SAFE AREA (keep all important content here)

DIGITAL MINI

TEMPLATE

Page size:		170mm x 250mm Bleed			5mm

Page size with bleed:	175mm x 260mm

Delete this layer before exporting your PDF.

TRIMLINE

For more information see newspaperclub.com

BLEED

You can place artwork across the centre fold, but be aware that if these two pages are to be printed on separate sheets, some misalignment may occur.